ηΔ

2- 1- 0 1 2

(rad) φΔ

0 2 4

)φΔ,ηΔ(_2P

0 0.2 0.4 3-10

×^{ALICE, Pb-Pb}_{= 2.76 TeV} NNs

0-5% c < 2.0 GeV/ Tp 0.2 <

(a)